SMTL Dressings Datacard

Product Name: KALTOCARB

Classification Name: Dressing Calcium/Sodium Alginate with Activated Charcoal

Manufacturer: ConvaTec Ltd

Description

[*** display ps-kaltcarb ***]

[*** linked kaltocarb-01 ***]Kaltocarb consists of an absorbent fibrous fleece of calcium sodium alginate (see Kaltostat) bonded to a layer of activated charcoal cloth with an outer layer composed of spun bonded viscose. The dressing combines the highly absorbent, gel forming properties of Kaltostat with the odour absorbing properties of activated charcoal.

Indications

Kaltocarb is indicated for use as a primary dressing in the management of malodorous wounds including [*** linked fung-breast-01 ***] fungating carcinomas, [*** linked l-ulc-venous-01 ***] leg ulcers, and [*** linked p-sore-g4-01 ***] pressure sores. Although not specifically contra-indicated, Kaltocarb will be of little value if applied to wounds that are dry, or covered with hard black necrotic tissue.

Contra-Indications

Known sensitivity to Kaltocarb or its components.

Method of use

Kaltocarb is placed onto the surface of the wound with the charcoal layer uppermost. A secondary dressing is then applied which is held in place with surgical tape or a bandage. Kaltocarb can be removed with forceps or the gloved fingers. If necessary, removal may be facilitated by first moistening the dressing with sterile normal saline.

Frequency of Change

On non-infected, malodorous wounds, Kaltocarb may be left undisturbed until the dressing becomes saturated or until exudate strikes through the secondary dressing (typically 2-3 days). On infected wounds, the dressing should be changed daily.

Warnings

The dressing should be changed daily on wounds that show evidence of clinical infection.

Presentation

Kaltocarb is presented individually wrapped in a peel pouch, sterilised by gamma irradiation.

Sizes

7.5 cm × 12.0 cm* 15.0 cm × 15.0 cm

Bibliography

1. Lawrence JC, et al., Malodour and dressings containing active charcoal, Proceedings of the 2nd European Conference on Advances in Wound Management, Ed Harding KG, Cherry G, Dealey C, and Turner TD, Macmillan Magazines Ltd, 1993, pp 73-74. 2. Thomas S, Current Practices in the Management of Fungating Lesions and Radiation Damaged Skin, Surgical Materials Testing Laboratory, Bridgend, 1992. Bycroft L, Care of a handicapped woman with metastatic breast cancer, British Journal of Nursing, 1992, 3, (3), 126-133. Woodhouse P, Managing a breast wound, Nursing Times, 88, (12), 72-75.

Revision Details

Revision Author Dr S. Thomas Revision No 1.3 Revision date 1997/12/16

Please inform SMTL of any inaccuracies or changes required in this datacard.

Disclaimer

This datacard has been prepared as an aid to contracting for purchasers in the NHS in Wales, and should not be used as a substitute for literature, instructions or training from the manufacturers of the devices.