SMTL Dressings Datacard

Product Name: DURAPORE

Classification Name: Tape Permeable, Woven, Synthetic Adhesive

Manufacturer: 3M Health Care Ltd

Description

[*** display ps-durapore ***]

[*** linked durapore-01 ***] Durapore surgical tape consists of a non-extensible [*** linked durapore-02 ***] woven acetate-taffeta fabric coated with a layer of an acrylic adhesive. The tape is very strong but the nature of the fabric is such that it allows for bidirectional tear. The tape is permeable to moisture vapour and will therefore tend not to cause maceration of the skin. Durapore is radio-transparent.

Indications

Durapore is most commonly used for retaining dressings on non-flexing areas where strength is important. As the tape is coated with an acrylic adhesive system, it may usually be applied to patients who have exhibited an adverse reaction to adhesives containing rubber or resin.

Contra-Indications

Although there are no absolute contra-indications to the use of Durapore, it should (like most tapes) be used with caution on patients who have very fragile skin, such as those on long-term steroid therapy.

Warnings

It should not be necessary to use skin tackifiers, such as tincture of benzoin, with Durapore. Because the tape is not extensible, care should be taken to ensure that it is not applied under tension (which could cause damage to the skin by exerting a shearing force).

Presentation

Storage

In common with all adhesive products, Durapore should be stored in a dry place, and not subjected to extremes of temperature.

Sizes

1.25 cm × 9.14 m 2.5 cm × 9.14 m 5.0 cm × 9.14 m 7.5 cm × 9.14 m

Revision Details

Revision Author Dr S. Thomas Revision No 1.4 Revision date 1997/12/16

Please inform SMTL of any inaccuracies or changes required in this datacard.

Disclaimer

This datacard has been prepared as an aid to contracting for purchasers in the NHS in Wales, and should not be used as a substitute for literature, instructions or training from the manufacturers of the devices.